
diff -r fd16c54261b3 -r 489c9b5090e2 hotspot/build/windows/projectfiles/core/vm.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/hotspot/build/windows/projectfiles/core/vm.def	Sat Dec 01 00:00:00 2007 +0000
@@ -0,0 +1,7 @@
+;
+; This .DEF file is a placeholder for one which is automatically
+; generated during the build process. See
+; build\windows\build_vm_def.sh and
+; build\windows\makefiles\makedeps.make (esp. the "-prelink"
+; options).
+;




